0.0

2.0

4.0

6.0

8.0

10.0

12.0

14.0

-40.0 -20.0 0.0 20.0 height (km) vs temp (C) 0.0

2.0

4.0

6.0

8.0

10.0

12.0

14.0

-30.0 -15.0 0.0 15.0 height (km) vs u-v wind (m/s)

900

800

700

600

500

400

300

200 hour: 13 month: 9 year: 2001